Microsoft hosts emergency press conference after protesters ‘storm a building’

Microsoft president Brad Smith hosted an impromptu press convention on Tuesday afternoon, simply hours after protesters gained entry to a constructing on the firm’s headquarters and held a sit-in demonstration inside his workplace.

Support authors and subscribe to content

This is premium stuff. Subscribe to read the entire article.

Login if you have purchased

Subscribe
Gain access to all our Premium contents.
More than 100+ articles.
Subscribe Now

The post Microsoft hosts emergency press conference after protesters ‘storm a building’ appeared first on Green Bridgestone.